CONT: IPOL 4.9965E+11 HZ M51.MODEL.1

PLot file version 1 created 06-JUL-2000 08:16:18

Cont peak flux = 2.2431E-01 JY/BEAM Levs = 2.243E-03 * (1, 2, 5, 10, 20, 50, 90)

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

00 00 00.15 00.10 00.05 00.0023 59 59.95 59.90 59.85

-22 59 57.5

58.0

58.5

59.0

59.5

60.0

-23 00 00.5

01.0

01.5

02.0

02.5