The worst sidelobe = 0.211; X = -0.6; Y = -1.2 Input file:LK:DONUT_MASK10 Iteration number 1. Elev = 90deg

Plot file version 40 created 03-MAR-2000 13:20:25

Y-unit

X-unit

-1.0 -0.5 0.0 0.5 1.0

1.0

0.5

0.0

-0.5

-1.0