99930.812 MHz RR 118A1SN-60 3.NUVCO.1

PLot file version 2 created 08-DEC-1999 11:58:11

128 R bins of width 1.112E+04 Wavelengths

Count

Mega Wavelengths

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4

40

35

30

25

20

15

10

5

0